ALM-9300 9 5 4 . 3 p p b ( 1 9 9 1 ) (NOAA-190)

CLM-2412

1 8 7 p p t ( 1 9 9 1 )

(NOAA-193)

CLM-2434

4 0 1 p p t ( 1 9 9 1 )

(NOAA-202)

CLM-2442

7 9 5 p p t ( 1 9 9 1 )

(NOAA-203)

CLM-2445 1 0 2 6 p p t ( 1 9 9 1 ) (NOAA-204)

ALM-9284

7 5 3 . 5 p p b ( 1 9 9 1 )

(NOAA-192)

CLM-3802

4 8 9 p p b ( 1 9 9 2 )

CLM-3803

2 . 8 p p b ( 1 9 9 2 )

CLM-3821

5 . 7 p p b ( 1 9 9 2 ) CLM-3830

8 . 4 p p b ( 1 9 9 2 )

ALM-38408

5 2 . 2 p p t ( 1 9 9 3 )

ALM-26778

5 2 . 0 p p t ( 1 9 9 3 )

ALM-26742

5 4 . 0 p p t ( 1 9 9 3 )

ALM-26735

1 1 1 . 8 p p t ( 1 9 9 3 )

ALM-26738

1 1 1 . 7 p p t ( 1 9 9 3 )

ALM-38417

1 1 8 . 7 p p t ( 1 9 9 3 )

ALM-26743

1 6 8 . 3 p p t ( 1 9 9 3 )

ALM-26737

1 8 3 . 2 p p t ( 1 9 9 3 )

ALM-26775

1 6 9 . 7 p p t ( 1 9 9 3 )

ALM-26729

1 1 0 . 7 p p t ( 1 9 9 3 ) ALM-26733

5 2 . 3 p p t ( 1 9 9 3 )

liquid reagent

AAL-15891

1 0 . 2 p p b ( 1 9 9 1 )

(NOAA-191)

CCl4 (October, 2003)

CLM-2426

3 7 . 1 p p t ( 1 9 9 1 )

(NOAA-197)

CLM-2431

7 8 . 0 p p t ( 1 9 9 1 )

(NOAA-195)

CLM-2482

1 0 9 . 2 p p t ( 1 9 9 1 )

(NOAA-194)

CLM-2413

2 1 5 . 0 p p t ( 1 9 9 1 )

(NOAA-196)

CLM-11528

2 6 2 . 3 p p t ( 2 0 0 1 )

CLM-9024a

1 5 9 . 9 p p t ( 2 0 0 1 )

CLM-7512

2 9 4 . 6 p p t ( 2 0 0 1 )

CLM-7527

2 7 3 . 6 p p t ( 2 0 0 1 )

ALM-64598

5 3 8 p p t ( 1 9 9 6 )

ALM-52792

2 2 . 1 p p t ( 1 9 9 6 )

ALM-9304

3 7 9 p p b ( 1 9 9 0 )

(NOAA-183)

CLM-2427

7 . 3 1 p p b ( 1 9 9 0 )

(NOAA-184)

CLM-2460

1 0 0 p p t ( 1 9 9 0 )

(NOAA-185)

CLM-2453

1 4 7 . 5 p p t ( 1 9 9 0 )

(NOAA-186)

CLM-2421

9 2 . 3 p p t ( 1 9 9 0 )

(NOAA-187)

CLM-2423

5 1 . 8 p p t ( 1 9 9 0 )

(NOAA-188)

1996 scale

Round Robin series

ALM-64466a

5 5 9 . 6 p p b ( 2 0 0 1 )

(old EM Sci. reagent)

ALMX-67964

7 3 2 . 1 p p b ( 2 0 0 1 )

(new Sigma reagent)

ALM-64608b

9 1 . 6 p p t ( 2 0 0 1 )

ALM-64981a

4 5 . 6 p p t ( 2 0 0 1 )

AAL-15900

2 8 5 p p b ( 1 9 8 9 )

(NOAA_137)

CLM-2471

1 1 5 . 4 p p t ( 1 9 9 0 )

(NOAA-173)

CLM-2420 9 9 . 8 p p t ( 1 9 9 0 )(NOAA-177) CLM-5671 4 9 . 5 p p t ( 1 9 9 0 )(NOAA-178)

CLM-5681 1 4 . 7 p p t ( 1 9 9 0 )(NOAA-180) x

ALM-52788 5 0 . 6 p p t ( 1 9 9 6 )

ALM-599677 9 . 4 p p t ( 1 9 9 6 )

ALM-528111 0 8 . 3 p p t ( 1 9 9 6 ) ALM-645961 4 0 . 1 p p t ( 1 9 9 6 )

ALM-9291

4 8 1 . 9 p p b ( 1 9 9 6 )

SX-3506

9 4 . 2 p p t ( 2 0 0 2 )

SX-3505

4 7 . 4 p p t ( 2 0 0 2 )

ALM-65990a

1 5 3 . 1 p p t ( 2 0 0 2 )

ALM-33800a

1 2 7 . 7 p p t ( 2 0 0 2 )

ALM-38422a

2 3 0 . 0 p p t ( 2 0 0 2 )

EM Science and Sigma-Aldrich

SX-3519

5 0 . 1 p p t ( 2 0 0 3 )

SX-3518

2 5 . 4 p p t ( 2 0 0 3 )

SX-3522

4 1 . 5 p p t ( 2 0 0 3 )

2002 scale in yellow;

most recent standards in violet

ALM-67682a

7 4 . 3 p p t ( 2 0 0 3 )

CLM-2441

1 4 3 . 7 p p t ( 1 9 9 0 )

(NOAA-179)