ALM-9300 1 1 9 p p b ( 1 9 9 1 ) (NOAA-190)

CLM-2412

2 3 . 5 p p t ( 1 9 9 1 )

(NOAA-193)

CLM-2434

5 0 . 1 p p t ( 1 9 9 1 )

(NOAA-202)

CLM-2442

9 9 . 3 p p t ( 1 9 9 1 )

(NOAA-203)

CLM-2445 1 2 8 . 2 p p t ( 1 9 9 1 ) (NOAA-204)

ALM-9284

1 3 2 p p b ( 1 9 9 1 )

(NOAA-192)

CLM-3831

3 5 5 . 8 p p m

( 1 9 9 2 )

CLM-3803

1 . 2 p p b ( 1 9 9 2 )

CLM-3821

2 . 4 p p b ( 1 9 9 2 ) CLM-3830

4 . 1 p p b ( 1 9 9 2 )

ALM-38408

2 2 . 1 p p t ( 1 9 9 3 )

ALM-26778

2 2 . 0 p p t ( 1 9 9 3 )

ALM-26742

2 2 . 9 p p t ( 1 9 9 3 )

ALM-26735

4 8 . 0 p p t ( 1 9 9 3 )

ALM-26738

4 8 . 0 p p t ( 1 9 9 3 )

ALM-38417

5 0 . 9 p p t ( 1 9 9 3 )

ALM-26743

8 2 . 8 p p t ( 1 9 9 3 )

ALM-26737

9 0 . 0 p p t ( 1 9 9 3 )

ALM-26775

8 3 . 4 p p t ( 1 9 9 3 )

ALM-26729

4 7 . 5 p p t ( 1 9 9 3 ) ALM-26733

2 2 . 2 p p t ( 1 9 9 3 )

liquid reagent

AAL-15891

1 . 3 p p b ( 1 9 9 1 )

(NOAA-191)

CFC-113 (April, 2002)

CLM-2426

6 . 5 p p t ( 1 9 9 1 )

(NOAA-197)

CLM-2431

1 3 . 6 p p t ( 1 9 9 1 )

(NOAA-195)

CLM-2482

1 9 . 1 p p t ( 1 9 9 1 )

(NOAA-194)

CLM-2413

3 7 . 5 p p t ( 1 9 9 1 )

(NOAA-196)

CLM-11528

4 5 . 8 p p t ( 2 0 0 1 )

CLM-9024a

2 7 . 9 p p t ( 2 0 0 1 )

CLM-7512

5 1 . 4 p p t ( 2 0 0 1 )

CLM-7527

4 7 . 8 p p t ( 2 0 0 1 )

AAL-15897

1 9 3 p p b ( 1 9 8 8 )

(NOAA-114)

FF-30091

1 2 4 . 0 p p t ( 1 9 8 8 )

(NOAA-128)

FF-30495

1 9 5 . 2 p p t ( 1 9 9 0 )

(NOAA-175)

CLM-2443

9 3 . 5 p p t ( 1 9 9 0 )

(NOAA-181)

CLM-2405

9 1 . 8 p p t ( 1 9 9 0 )

(NOAA-182)

ALM-9304

1 2 3 p p b ( 1 9 9 0 )

(NOAA-183)

CLM-2427

2 . 3 7 p p b ( 1 9 9 0 )

(NOAA-184)

CLM-2460

3 2 . 4 p p t ( 1 9 9 0 )

(NOAA-185)

CLM-2453

4 7 . 8 p p t ( 1 9 9 0 )

(NOAA-186)

CLM-2421

2 9 . 9 p p t ( 1 9 9 0 )

(NOAA-187)

CLM-2423

1 6 . 8 p p t ( 1 9 9 0 )

(NOAA-188)

low pressure

Round Robin series

ALM-64466a

5 6 8 . 4 p p b ( 2 0 0 1 ) ALMX-67964

5 4 4 . 1 p p b ( 2 0 0 1 )

ALM-64608

9 3 . 1 p p t ( 2 0 0 1 )

ALM-64981

4 6 . 3 p p t ( 2 0 0 1 )

Standards made prior to 1990 are not shown here.

AAL-15900

1 1 7 p p b ( 1 9 8 9 )

(NOAA_137)

CLM-2471

4 7 . 3 p p t ( 1 9 9 0 )

(NOAA-173)

CLM-24204 0 . 9 p p t ( 1 9 9 0 )(NOAA-177) CLM-5676 1 . 3 p p t ( 1 9 9 0 )(NOAA-178)

CLM-24415 8 . 9 p p t ( 1 9 9 0 )(NOAA-179)

CLM-5684 7 . 0 p p t ( 1 9 9 0 )(NOAA-180) SX-35067 0 . 0 p p t ( 2 0 0 2 )

SX-3505

3 5 . 3 p p t ( 2 0 0 2 )

ALM-65990a

1 1 3 . 8 p p t ( 2 0 0 2 )

ALM-33800a

9 4 . 9 p p t ( 2 0 0 2 )

ALM-38422a

1 7 1 . 0 p p t ( 2 0 0 2 )

SX-3519

3 7 . 0 p p t ( 2 0 0 3 )

SX-3518

1 8 . 9 p p t ( 2 0 0 3 )

SX-3522

3 0 . 8 p p t ( 2 0 0 3 )