ALM-9300 2 8 2 p p b ( 1 9 9 1 ) (NOAA-190)

CLM-2412

5 5 . 2 p p t ( 1 9 9 1 )

(NOAA-193)

CLM-2434

1 1 8 . 4 p p t ( 1 9 9 1 )

(NOAA-202)

CLM-2442

2 3 4 . 7 p p t ( 1 9 9 1 )

(NOAA-203)

CLM-2445 3 0 2 . 9 p p t ( 1 9 9 1 ) (NOAA-204)

ALM-9284

4 7 8 p p b ( 1 9 9 1 )

(NOAA-192)

ALM-26750

231.8 ppb ( 1 9 9 2 )

CLM-3803

1 . 3 8 p p b ( 1 9 9 2 )

CLM-3821

3 . 8 8 p p b ( 1 9 9 2 ) CLM-3830

1 4 . 4 p p b ( 1 9 9 2 )

ALM-38408

2 5 . 5 p p t ( 1 9 9 3 )

ALM-26778

2 5 . 4 p p t ( 1 9 9 3 )

ALM-26742

2 6 . 4 p p t ( 1 9 9 3 )

ALM-26735

7 6 . 2 p p t ( 1 9 9 3 )

ALM-26738

7 6 . 2 p p t ( 1 9 9 3 )

ALM-38417

8 0 . 9 p p t ( 1 9 9 3 )

ALM-26743

2 8 8 . 2 p p t ( 1 9 9 3 )

ALM-26737

3 1 3 . 6 p p t ( 1 9 9 3 )

ALM-26775

2 9 0 . 6 p p t ( 1 9 9 3 )

ALM-26729

7 5 . 4 p p t ( 1 9 9 3 ) ALM-26733

2 5 . 6 p p t ( 1 9 9 3 )

liquid reagent

AAL-15891

3 . 0 p p b ( 1 9 9 1 )

(NOAA-191)

ALM-26745

4 . 3 p p b ( 1 9 9 2 )

CFC-11 Standard Tree (June 12, 2001)

CLM-2426

2 3 . 5 p p t ( 1 9 9 1 )

(NOAA-197)

CLM-2431

4 9 . 5 p p t ( 1 9 9 1 )

(NOAA-195)

CLM-2482

6 9 . 2 p p t ( 1 9 9 1 )

(NOAA-194)

CLM-2413

1 3 6 . 3 p p t ( 1 9 9 1 )

(NOAA-196)

CLM-11528

1 6 6 . 5 p p t ( 2 0 0 1 )

CLM-9024a

1 0 1 . 5 p p t ( 2 0 0 1 )

CLM-7512

1 8 7 . 0 p p t ( 2 0 0 1 )

CLM-7527

1 7 3 . 7 p p t ( 2 0 0 1 )

AAL-15897

2 6 4 p p b ( 1 9 8 8 )

(NOAA-114)

FF-30091

1 6 9 . 1 p p t ( 1 9 8 8 )

(NOAA-128)

FF-30495

2 6 6 . 1 p p t ( 1 9 9 0 )

(NOAA-175)

CLM-2443

1 2 7 . 5 p p t ( 1 9 9 0 )

(NOAA-181)

CLM-2405

1 2 5 . 2 p p t ( 1 9 9 0 )

(NOAA-182)

ALM-9304

4 5 3 p p b ( 1 9 9 0 )

(NOAA-183)

CLM-2427

8 . 7 5 p p b ( 1 9 9 0 )

(NOAA-184)

CLM-2460

1 1 9 . 7 p p t ( 1 9 9 0 )

(NOAA-185)

CLM-2453

1 7 6 . 5 p p t ( 1 9 9 0 )

(NOAA-186)

CLM-2421

1 1 0 . 6 p p t ( 1 9 9 0 )

(NOAA-187)

CLM-2423

6 2 . 0 p p t ( 1 9 9 0 )

(NOAA-188)

This chart is not complete. More CFC-11 standards exsist from 1988-1989.

All ppt CFC-11 standards show good agreement (within 1%)

low pressure