ALM-9300 1 . 5 p p m ( 1 9 9 1 ) (NOAA-190)

CLM-2412

2 8 6 . 5 p p t ( 1 9 9 1 )

(NOAA-193)

CLM-2434

6 1 4 . 8 p p t ( 1 9 9 1 )

(NOAA-202)

CLM-2442

1 2 1 8 p p t ( 1 9 9 1 )

(NOAA-203)

CLM-2445

1 5 7 2 p p t ( 1 9 9 1 )

(NOAA-204)

ALM-9284

1 . 5 8 p p m ( 1 9 9 1 )

(NOAA-192)

CLM-3807

2.5 ppm ( 1 9 9 2 )

liquid reagent

AAL-15891

1 5 . 6 p p b ( 1 9 9 1 )

(NOAA-191)

CFC-12 Standard Tree (July 12, 2001)

CLM-2426

7 7 . 8 p p t ( 1 9 9 1 )

(NOAA-197) CLM-8946

3 6 . 5 p p b ( 1 9 9 7 )

CLM-2482

2 2 8 . 8 p p t ( 1 9 9 1 )

(NOAA-194)

CLM-2413

4 5 0 . 7 p p t ( 1 9 9 1 )

(NOAA-196)

CLM-11528

5 5 0 . 5 p p t ( 2 0 0 1 )

CLM-9024a

3 3 5 . 6 p p t ( 2 0 0 1 )

CLM-7512

6 1 8 . 2 p p t ( 2 0 0 1 )

CLM-7527

5 7 4 . 1 p p t ( 2 0 0 1 )

AAL-15897

4 3 7 p p b ( 1 9 8 8 )

(NOAA-114)

CLM-2443

2 1 2 p p t ( 1 9 9 0 )

(NOAA-181)

CLM-2405

2 0 7 p p t ( 1 9 9 0 )

(NOAA-182)

FF-30495

4 4 2 p p t ( 1 9 9 0 )

(NOAA-175)

FF-30091

2 8 1 p p t ( 1 9 8 8 )

(NOAA-128)

Round Robin series

CLM-3803

CLM-3830

CLM-3821

( 1 9 9 3 )

ALM-26735

ALM-26737

ALM-26738

ALM-26743 do not conform to 1997 scale

CLM-2431

1 6 3 . 5 p p t ( 1 9 9 1 )

(NOAA-195) CLM-9015

1 8 9 . 2 p p t ( 1 9 9 7 )

CLM-9041

2 7 4 . 4 p p t ( 1 9 9 7 )

CLM-9018

3 7 0 . 3 p p t ( 1 9 9 7 )

CLM-8958

4 8 5 . 0 p p t ( 1 9 9 7 )

CLM-9038

6 4 6 . 9 p p t ( 1 9 9 7 )

CLM-11557

5 4 6 . 8 p p t ( 2 0 0 1 )

CLM-11574

6 1 6 . 5 p p t ( 2 0 0 1 )

FF-30073

1 8 7 8 p p m ( 1 9 8 8 )

(NOAA-124)

vapor reagent

‘ ‘

FF-30078 1 . 9 7 p p m ( 1 9 8 8 ) (NOAA-125)

NOAA-130NOAA-131NOAA-132NOAA-133NOAA-134 ( 1 9 8 8 )

NOAA-172NOAA-174 ( 1 9 9 0 ) obsolete

1997 scale in yellow