ALM-26775 1 . 4 4 p p m ( 1 9 9 5 )

CH

3

I

ALM-9297

3 3 3 p p b ( 1 9 9 5 )

CLM-7517

1 1 . 0 p p b ( 1 9 9 5 )

liquid reagent

( J u n e 6 , 2 0 0 4 )

CLM-9033

2 0 2 . 7 p p t ( 1 9 9 5 )

ALM-9290

2 6 . 5 p p t ( 1 9 9 5 )

CC-62626

2 . 5 p p t ( 1 9 9 5 )

ALM-32571

5 . 1 p p t ( 1 9 9 5 )

2001 assessment: scale uncertainty is at least 20% (ppt standards vary by 20%).

Low-level standards differ from ppm standards by factor of 2.

(not reliable)

ALM-39761

3 8 2 p p b ( 2 0 0 4 ) ALM-52868

2 8 0 p p b ( 2 0 0 4 )

Sigma-Aldrich liquid reagent (99.9%)

SX-3533

2 . 8 6 p p t ( 2 0 0 4 )

SX-3534

5 . 7 7 p p t ( 2 0 0 4 )

SX-3535

7 8 . 3 p p t ( 2 0 0 4 )