CLM-2412 9 1 . 9 p p t ( 1 9 9 1 ) (NOAA-193)

CLM-2434

1 9 7 p p t ( 1 9 9 1 )

(NOAA-202)

ALM-9300

4 6 8 . 8 p p b ( 1 9 9 1 )

(NOAA-190)

CAL-12666

5 4 . 1 p p m ( 1 9 9 2 )

NOAA-210

CLM-2442 3 9 1 p p t ( 1 9 9 1 ) (NOAA-203)

CLM-2445

5 0 4 p p t ( 1 9 9 1 )

(NOAA-204)

CLM-573

8 . 5 p p b ( 1 9 9 2 )

(NOAA-211)

CC-68280

7 8 8 p p b ( 1 9 9 2 ) CLM-3790

5 6 . 4 p p m ( 1 9 9 2 )

CLM-3803

2 . 6 p p b ( 1 9 9 2 ) CLM-3821

5 . 4 p p b ( 1 9 9 2 ) CLM-3830

7 . 3 p p b ( 1 9 9 2 )

ALM-38408

4 8 . 3 p p t ( 1 9 9 3 )

ALM-26778

4 8 . 1 p p t ( 1 9 9 3 )

ALM-26735

1 0 5 p p t ( 1 9 9 3 )

ALM-26738

1 0 5 p p t ( 1 9 9 3 )

ALM-38417

1 1 2 p p t ( 1 9 9 3 )

ALM-26743

1 4 5 p p t ( 1 9 9 3 )

ALM-26737

1 5 8 p p t ( 1 9 9 3 )

ALM-26775

1 4 5 p p t ( 1 9 9 3 )

ALM-26729

1 0 4 p p t ( 1 9 9 3 ) ALM-26733

4 8 . 5 p p t ( 1 9 9 3 )

KLM-1445

1 6 9 p p t ( 1 9 9 2 )

CLM-579

9 8 p p t ( 1 9 9 2 )

(NOAA-212)

FF-30490

4 9 p p t ( 1 9 9 2 )

(NOAA-213)

CLM-2417

9 . 4 p p t ( 1 9 9 2 )

(NOAA-214)

vapor reagent liquid reagent

AAL-15891

5 . 0 p p b ( 1 9 9 1 )

(NOAA-191)

ALM-26745

7 . 2 p p b ( 1 9 9 2 ) FF-30083

1 1 6 p p t ( 1 9 9 2 ) CLM-3829

4 8 9 p p b ( 1 9 9 2 )

HCFC-22 Standard Tree (October, 2001)

all 17% low all fairly consistent not analyzed not analyzed

ALM-000806

7 2 3 p p b ( 1 9 8 8 )

(NOAA-115)

FF-30100

1 5 0 p p m ( 1 9 8 9 )

(NOAA-143)

FF-30087

1 3 . 9 p p b ( 1 9 8 9 )

(NOAA-144)

CLM-2439

4 9 4 p p b ( 1 9 9 1 )

ALM-26742

1 4 5 p p t ( 1 9 9 3 )

CLM-573 8 . 5 p p b ( 1 9 9 2 ) (NOAA-211)

CLM-579

9 8 p p t ( 1 9 9 2 )

(NOAA-212)

FF-30490

4 9 p p t ( 1 9 9 2 )

(NOAA-213)

CLM-2417

9 . 4 p p t ( 1 9 9 2 )

(NOAA-214)

not analyzed

CLM-2439 4 9 4 p p b ( 1 9 9 1 )