PureReagentHFC-134a

FF-30126(NOAA-127)(1988)1021.2ppm

CC-68282

(1995)

9.18ppm

CLM-2422(NOAA-198)446.2ppb(1991)

CC-64039224.9ppt(1995)

ALM-651325.2ppt(2000)CLM-85925.44ppt(1995)ALM-6772049.8ppt(2000)CLM-903610.22ppt(1995)