99.99% SF6 Scott Specialty Gases

CLM-7502

3 0 . 4 p p m ( 1 9 9 4 )

FA-31502

1 9 2 . 5 p p m ( 2 0 0 0 )

CLM-7519

6 5 1 . 6 p p b ( 1 9 9 4 )

FF-30500 2 1 . 7 p p b ( 2 0 0 0 )

FF-39460

2 3 . 2 p p b ( 2 0 0 0 )

CLM-7506

3 . 0 8 p p t ( 1 9 9 4 )

CLM-7519

2 3 . 2 p p t ( 1 9 9 4 )

CLM-7494

6 0 . 6 p p t ( 1 9 9 4 )

CLM-7503

1 0 7 . 6 p p t ( 1 9 9 4 )

FA-1856

1 . 1 4 p p t ( 2 0 0 0 )

FA-1861

2 . 4 1 p p t ( 2 0 0 0 )

FA-1878

2 . 9 1 p p t ( 2 0 0 0 )

FF-30496

5 . 8 5 p p t ( 2 0 0 0 )

FF-30497

7 . 7 3 p p t ( 2 0 0 0 )

FF-30498a

3 . 4 7 p p t ( 2 0 0 0 )

FA-1865

4 . 1 2 p p t ( 2 0 0 0 )

FF-32812

4 . 1 6 p p t ( 2 0 0 0 )

FF-30505a

4 . 3 0 p p t ( 2 0 0 0 )

FA-1851

4 . 3 2 p p t ( 2 0 0 0 )

FF-6664

9 . 1 7 p p t ( 2 0 0 2 )

FF-30499a

4 . 4 7 p p t ( 2 0 0 0 )

FA-1850

4 . 5 1 p p t ( 2 0 0 0 )

FA-1843

4 . 7 3 p p t ( 2 0 0 0 )

FF-30512

4 . 7 7 p p t ( 2 0 0 0 )

FF-30501a

4 . 9 2 p p t ( 2 0 0 0 )

FA-1845

8 . 7 8 p p t ( 2 0 0 2 )

FA-1853

4 . 9 1 p p t ( 2 0 0 0 )

FA-1869

6 . 9 0 p p t ( 2 0 0 0 )

FA-1871

2 9 . 6 p p b ( 2 0 0 0 )

FA-1940

1 0 . 2 9 p p t ( 2 0 0 0 )

FA-2127

0 . 9 9 p p t ( 2 0 0 2 )

FA-2137

2 . 9 0 p p t ( 2 0 0 2 )

FA-2139

5 . 0 4 p p t ( 2 0 0 2 )

FA-2205

4 . 9 4 p p t ( 2 0 0 3 )

FA-2207

5 . 9 8 p p t ( 2 0 0 3 )

FA-2208

6 . 9 7 p p t ( 2 0 0 3 )